Zone Measurement Read

KByte/s

Zone Measurement Write

Test started: 02-27-04 15:18:23, test version: $Id: h2bench.c,v 3.6 2002/10/31 14:06:35 bo Exp $/Win32, file name ’ha_ibm-md-1G_RW’ command line: h2benchw -english -w ha_ibm-md-1G_RW -! -c 0 -z -s 1 timer resolution: 0.279 μs, 3.580 MHz, timer statistics: 10093 calls, min 5123.56 μs, average 102469.64 μs, max 1251970.57 μs

HAMA PocketDrive 6in1 USB 2.0; hama 47121