Zone Measurement Read

KByte/s

Zone Measurement Write

IDENTIFY DEVICE information:

Test started: 02-28-04 21:30:09, test version: $Id: h2bench.c,v 3.6 2002/10/31 14:06:35 bo Exp $/Win32, file name ’pc_tos-18i-5G_RW’ command line: h2benchw -english -w pc_tos-18i-5G_RW -! -c 0 -z -s 1 timer resolution: 0.279 μs, 3.580 MHz, timer statistics: 10044 calls, min 2335.21 μs, average 756811.20 μs, max 4276443.51 μs

Toshiba MK5002MPL